Figure 8: The CC reduced cross-section σ̃_{CC} (x, Q^2) is shown for e^−p scattering at √ s ≈ 300 GeV (solid squares) and e^+p scattering at with √ s ≈ 320 GeV (open squares). The data are compared to the H1 e^+p QCD fit. The inner error bars represent the statistical error, and the outer error bars show the total error.