δL L = 3%^{δL}_L = 3%

(a) (b)

(c) (d)

Figure 3: The Q^2 dependence of the NC (a) and CC (b) cross-sections dσ/dQ^2 are shown for the preliminary e^−p (solid points) and e^+p (open points) measurements. The data are compared to the Standard Model expectation determined from the H1 e^+p QCD fit including the H1 e^+p data. The influence of the increased centre-of-mass energy is shown as the dashed curve. The ratio of the e^−p data to the Standard Model expectation is shown in figures (c) and (d) for NC and CC respectively. The Standard Model Uncertainty is shown as the shaded band. The 3% luminosity uncertainy is not included in the error bars.