Figure 5: The CC cross-section dσ/dx for Q^2 > 1 000 GeV^2 and y < 0.9 is shown for the preliminary H1 e^−p data (solid points) and the H1 e^+p data (open points). The solid curves show the Standard Model expectation based on the H1 e^+p QCD fit. The dashed curve shows the influence of the increased centre-of-mass energy.